[#conf_method_st-load_bio]
= xref:conf_method_st.adoc[conf&lowbar;method&lowbar;st]::load&lowbar;bio
:relfileprefix: ../
:mrdocs:

Load configuration syntax from a BIO into `conf&semi;` `eline` receives error line&period;

== Synopsis

Declared in `&lt;openssl&sol;conftypes&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
int(* load&lowbar;bio)(xref:CONF.adoc[CONF]*, xref:BIO.adoc[BIO]*, long*);
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
