[#X509V3_CONF_METHOD_st-free_section]
= xref:X509V3_CONF_METHOD_st.adoc[X509V3&lowbar;CONF&lowbar;METHOD&lowbar;st]::free&lowbar;section
:relfileprefix: ../
:mrdocs:

Release a section stack previously returned by get&lowbar;section for this database&period;

== Synopsis

Declared in `&lt;openssl&sol;x509v3&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
void(* free&lowbar;section)(void*, stack&lowbar;st&lowbar;CONF&lowbar;VALUE*);
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
