[#OSSL_SELF_TEST_onend]
= OSSL&lowbar;SELF&lowbar;TEST&lowbar;onend
:mrdocs:

Signal the end of a self&hyphen;test block with pass&sol;fail (callback phase &quot;Pass&quot; or &quot;Fail&quot;)&period;

== Synopsis

Declared in `&lt;openssl&sol;self&lowbar;test&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
void
OSSL&lowbar;SELF&lowbar;TEST&lowbar;onend(
    xref:OSSL_SELF_TEST.adoc[OSSL&lowbar;SELF&lowbar;TEST]* st,
    int ret);
----

== Parameters

[cols="1,4"]
|===
| Name| Description
| *st*
| Self&hyphen;test object from OSSL&lowbar;SELF&lowbar;TEST&lowbar;new()&period;
| *ret*
| Non&hyphen;zero if the test passed&semi; zero if it failed&period;
|===


[.small]#Created with https://www.mrdocs.com[MrDocs]#
