[#OSSL_LIB_CTX_get0_global_default]
= OSSL&lowbar;LIB&lowbar;CTX&lowbar;get0&lowbar;global&lowbar;default
:mrdocs:

Return the process&hyphen;wide global default OSSL&lowbar;LIB&lowbar;CTX (not thread&hyphen;local)&period;

== Synopsis

Declared in `&lt;openssl&sol;crypto&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
xref:OSSL_LIB_CTX.adoc[OSSL&lowbar;LIB&lowbar;CTX]*
OSSL&lowbar;LIB&lowbar;CTX&lowbar;get0&lowbar;global&lowbar;default();
----

== Return Value

Borrowed pointer to the global default context&semi; do not free&period;


[.small]#Created with https://www.mrdocs.com[MrDocs]#
