[#OSSL_HTTP_REQ_CTX_set_max_response_hdr_lines]
= OSSL&lowbar;HTTP&lowbar;REQ&lowbar;CTX&lowbar;set&lowbar;max&lowbar;response&lowbar;hdr&lowbar;lines
:mrdocs:

Limit how many HTTP response header lines `rctx` will accept&period;

== Synopsis

Declared in `&lt;openssl&sol;http&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
void
OSSL&lowbar;HTTP&lowbar;REQ&lowbar;CTX&lowbar;set&lowbar;max&lowbar;response&lowbar;hdr&lowbar;lines(
    xref:OSSL_HTTP_REQ_CTX.adoc[OSSL&lowbar;HTTP&lowbar;REQ&lowbar;CTX]* rctx,
    size&lowbar;t count);
----

== Parameters

[cols="1,4"]
|===
| Name| Description
| *rctx*
| Request context to update&period;
| *count*
| Maximum header lines (0 means unlimited &sol; implementation default)&period;
|===


[.small]#Created with https://www.mrdocs.com[MrDocs]#
