[#OSSL_CMP_PKIHEADER_new]
= OSSL&lowbar;CMP&lowbar;PKIHEADER&lowbar;new
:mrdocs:

Allocate an empty OSSL&lowbar;CMP&lowbar;PKIHEADER structure&period;

== Synopsis

Declared in `&lt;openssl&sol;cmp&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
xref:OSSL_CMP_PKIHEADER.adoc[OSSL&lowbar;CMP&lowbar;PKIHEADER]*
OSSL&lowbar;CMP&lowbar;PKIHEADER&lowbar;new();
----

== Return Value

New OSSL&lowbar;CMP&lowbar;PKIHEADER, or NULL on allocation failure&period;


[.small]#Created with https://www.mrdocs.com[MrDocs]#
