[#OPENSSL_sk_new_null]
= OPENSSL&lowbar;sk&lowbar;new&lowbar;null
:mrdocs:

Allocate an empty stack with no comparison function&period;

== Synopsis

Declared in `&lt;openssl&sol;stack&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
xref:OPENSSL_STACK.adoc[OPENSSL&lowbar;STACK]*
OPENSSL&lowbar;sk&lowbar;new&lowbar;null();
----

== Return Value

New stack, or NULL on failure&semi; free with OPENSSL&lowbar;sk&lowbar;free()&period;


[.small]#Created with https://www.mrdocs.com[MrDocs]#
