[#COMP_get_name]
= COMP&lowbar;get&lowbar;name
:mrdocs:

Return the human&hyphen;readable name of a compression method&period;

== Synopsis

Declared in `&lt;openssl&sol;comp&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
char const*
COMP&lowbar;get&lowbar;name(xref:COMP_METHOD.adoc[COMP&lowbar;METHOD] const* meth);
----

== Return Value

Static name string that must not be freed, or NULL on failure&period;

== Parameters

[cols="1,4"]
|===
| Name| Description
| *meth*
| Compression method to query&period;
|===


[.small]#Created with https://www.mrdocs.com[MrDocs]#
