[#BIO_s_secmem]
= BIO&lowbar;s&lowbar;secmem
:mrdocs:

Return the BIO&lowbar;METHOD for a secure&hyphen;heap memory BIO&period;

== Synopsis

Declared in `&lt;openssl&sol;bio&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
xref:BIO_METHOD.adoc[BIO&lowbar;METHOD] const*
BIO&lowbar;s&lowbar;secmem();
----

== Description

Like BIO&lowbar;s&lowbar;mem(), but buffers are allocated from the OpenSSL secure heap&period;

== Return Value

Pointer to the static secure&hyphen;memory BIO method&period;


[.small]#Created with https://www.mrdocs.com[MrDocs]#
