[#BIO_f_reliable]
= BIO&lowbar;f&lowbar;reliable
:mrdocs:

Return the BIO filter method that adds a digest&hyphen;protected reliable stream&period;

== Synopsis

Declared in `&lt;openssl&sol;evp&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
xref:BIO_METHOD.adoc[BIO&lowbar;METHOD] const*
BIO&lowbar;f&lowbar;reliable();
----

== Description

Writes are checksummed so a reader can detect truncation or corruption&period;

== Return Value

Pointer to the BIO&lowbar;f&lowbar;reliable method&period;


[.small]#Created with https://www.mrdocs.com[MrDocs]#
