[#BIO_ADDR_new]
= BIO&lowbar;ADDR&lowbar;new
:mrdocs:

Allocate a zero&hyphen;initialized BIO&lowbar;ADDR for socket address APIs&period;

== Synopsis

Declared in `&lt;openssl&sol;bio&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
xref:BIO_ADDR.adoc[BIO&lowbar;ADDR]*
BIO&lowbar;ADDR&lowbar;new();
----

== Return Value

New BIO&lowbar;ADDR, or NULL on failure&semi; free with BIO&lowbar;ADDR&lowbar;free()&period;


[.small]#Created with https://www.mrdocs.com[MrDocs]#
