[#ASN1_TIME_normalize]
= ASN1&lowbar;TIME&lowbar;normalize
:mrdocs:

Normalize an ASN1&lowbar;TIME so it is suitable for certificates and consistent printing&period;

== Synopsis

Declared in `&lt;openssl&sol;asn1&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
int
ASN1&lowbar;TIME&lowbar;normalize(xref:ASN1_TIME.adoc[ASN1&lowbar;TIME]* s);
----

== Return Value

1 on success, or 0 on error&period;

== Parameters

[cols="1,4"]
|===
| Name| Description
| *s*
| Time (UTCTime or GeneralizedTime) to convert to a canonical GMT form&period;
|===


[.small]#Created with https://www.mrdocs.com[MrDocs]#
