[#mp_units-uniform_real_distribution-05-min]
= xref:mp_units.adoc[mp&lowbar;units]::xref:mp_units/uniform_real_distribution-05.adoc[uniform&lowbar;real&lowbar;distribution]::min
:relfileprefix: ../../
:mrdocs:

Returns the inclusive lower bound of the distribution range&period;

== Synopsis

Declared in `&lt;bits&sol;random&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
result&lowbar;type
min() const;
----

== Return Value

the inclusive lower bound of the distribution range&period;


[.small]#Created with https://www.mrdocs.com[MrDocs]#
