[#mp_units-natural_point_origin_]
= xref:mp_units.adoc[mp&lowbar;units]::natural&lowbar;point&lowbar;origin&lowbar;
:relfileprefix: ../
:mrdocs:

Implementation type of `natural&lowbar;point&lowbar;origin`

== Synopsis

Declared in `&lt;mp&hyphen;units&sol;framework&sol;quantity&lowbar;point&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
template&lt;xref:mp_units/QuantitySpec.adoc[QuantitySpec] auto QS&gt;
struct natural&lowbar;point&lowbar;origin&lowbar; final
    : &sol;&ast; implementation-defined &ast;&sol;
----

== Description

Derives from `absolute&lowbar;point&lowbar;origin&lt;QS&gt;`, additionally applying a non&hyphen;negative bounds check when `QS` is tagged as non&hyphen;negative and has a real&hyphen;scalar character&period;

== Base Classes

[cols="1,4"]
|===
| Name| Description
| `&sol;&ast; implementation-defined &ast;&sol;`
| 
|===

== Template Parameters

[cols="1,4"]
|===
| Name| Description
| *QS*
| quantity specification of the quantities measured from this origin
|===


[.small]#Created with https://www.mrdocs.com[MrDocs]#
