[#XLOG_EVERY_MS]
= XLOG&lowbar;EVERY&lowbar;MS
:mrdocs:

Similar to XLOG(&period;&period;&period;) except only log a message every

== Synopsis

Declared in `&lt;folly&sol;logging&sol;xlog&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
#define XLOG&lowbar;EVERY&lowbar;MS(level, ms, ...)

----

== Description

Note that this is threadsafe&period;

== Parameters

[cols="1,4"]
|===
| Name| Description
| *ms*
| milliseconds&period;
| *level*
| The `folly&colon;&colon;LogLevel` value at which to log&period;
|===


[.small]#Created with https://www.mrdocs.com[MrDocs]#
