[#SYNCHRONIZED_CONST]
= SYNCHRONIZED&lowbar;CONST
:mrdocs:

NOTE&colon; This API is deprecated&period; Use lock(), wlock(), rlock() or the withLock functions instead&period; In the future it will be marked with a deprecation attribute to emit build&hyphen;time warnings, and then it will be removed entirely&period;

== Synopsis

Declared in `&lt;folly&sol;Synchronized&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
#define SYNCHRONIZED&lowbar;CONST(...)

----

== Description

Similar to SYNCHRONIZED, but only uses a read lock&period;


[.small]#Created with https://www.mrdocs.com[MrDocs]#
