[#BENCHMARK_NAMED_PARAM_MULTI]
= BENCHMARK&lowbar;NAMED&lowbar;PARAM&lowbar;MULTI
:mrdocs:

Same as BENCHMARK&lowbar;NAMED&lowbar;PARAM, but allows one to return the actual number of iterations that have been run&period;

== Synopsis

Declared in `&lt;folly&sol;Benchmark&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
#define BENCHMARK&lowbar;NAMED&lowbar;PARAM&lowbar;MULTI(name, param&lowbar;name, ...)

----

== Parameters

[cols="1,4"]
|===
| Name| Description
| *name*
| The benchmarked function&apos;s identifier&period;
| *param&lowbar;name*
| The label used for this parameter set in the output&period;
|===


[.small]#Created with https://www.mrdocs.com[MrDocs]#
