[#boost-urls-url_view_base-max_size]
= xref:boost.adoc[boost]::xref:boost/urls.adoc[urls]::xref:boost/urls/url_view_base.adoc[url&lowbar;view&lowbar;base]::max&lowbar;size
:relfileprefix: ../../../
:mrdocs:


Return the maximum number of characters possible

== Synopsis


Declared in `&lt;https://www.github.com/boostorg/url/blob/develop/include/boost/url/url_view_base.hpp#L154[boost&sol;url&sol;url&lowbar;view&lowbar;base&period;hpp]&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
constexpr
static
std::size&lowbar;t
max&lowbar;size() noexcept;
----

== Description


This represents the largest number        of characters that are theoretically        possible to represent in a url,        not including any null terminator&period;        In practice the actual possible size        may be lower than this number&period;


=== Complexity

Constant&period;


=== Exception Safety

Throws nothing&period;





[.small]#Created with https://www.mrdocs.com[MrDocs]#
