[#boost-urls-params_encoded_ref-replace-08]
= xref:boost.adoc[boost]::xref:boost/urls.adoc[urls]::xref:boost/urls/params_encoded_ref.adoc[params&lowbar;encoded&lowbar;ref]::replace
:relfileprefix: ../../../
:mrdocs:


Replace params

== Synopsis


Declared in `&lt;https://www.github.com/boostorg/url/blob/develop/include/boost/url/params_encoded_ref.hpp#L745[boost&sol;url&sol;params&lowbar;encoded&lowbar;ref&period;hpp]&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
xref:boost/urls/params_encoded_base/iterator.adoc[iterator]
replace(
    xref:boost/urls/params_encoded_base/iterator.adoc[iterator] from,
    xref:boost/urls/params_encoded_base/iterator.adoc[iterator] to,
    std::initializer&lowbar;list&lt;xref:boost/urls/param_pct_view.adoc[param&lowbar;pct&lowbar;view]&gt; init);
----

== Description


This function replaces a range of        params with the params in an        _initializer&hyphen;list_&period;

All iterators that are equal to        `from` or come after are invalidated&period;

[NOTE]
The strings referenced by the inputs        must not come from the underlying url,        or else the behavior is undefined&period;


=== Complexity

Linear in `this&hyphen;&gt;url()&period;encoded&lowbar;query()&period;size()`&period;


=== Exception Safety

Strong guarantee&period;        Calls to allocate may throw&period;        Exceptions thrown on invalid input&period;



== Exceptions


|===
| Name | Thrown on

| `system&lowbar;error`
| `init` contains an invalid percent&hyphen;encoding&period;


|===

== Return Value


An iterator to the first        element inserted, or one past `to` if        `init&period;size() &equals;&equals; 0`&period;



== Parameters


|===
| Name | Description

| *from,to*
| The range of params        to replace&period;


| *init*
| The list of params to assign&period;


|===



[.small]#Created with https://www.mrdocs.com[MrDocs]#
