[#boost-urls-params_base-max_size]
= xref:boost.adoc[boost]::xref:boost/urls.adoc[urls]::xref:boost/urls/params_base.adoc[params&lowbar;base]::max&lowbar;size
:relfileprefix: ../../../
:mrdocs:

Return the maximum number of characters possible

== Synopsis

Declared in `&lt;https://www.github.com/boostorg/url/blob/develop/include/boost/url/params_base.hpp#L150[boost&sol;url&sol;params&lowbar;base&period;hpp]&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
constexpr
static
std::size&lowbar;t
max&lowbar;size() noexcept;
----

== Description

This represents the largest number of characters that are possible in a path, not including any null terminator&period;

== Exception Safety

Throws nothing&period;

== Return Value

The maximum number of characters possible&period;


[.small]#Created with https://www.mrdocs.com[MrDocs]#
