[#BOOST_URL_MAX_SIZE]
= BOOST&lowbar;URL&lowbar;MAX&lowbar;SIZE
:mrdocs:

The largest URL the library can hold&period;

== Synopsis

Declared in `&lt;https://www.github.com/boostorg/url/blob/develop/include/boost/url/detail/config.hpp#L217[boost&sol;url&sol;detail&sol;config&period;hpp]&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
#define BOOST&lowbar;URL&lowbar;MAX&lowbar;SIZE

----

== Description

Define this before including the library to lower or raise the cap&period; It leaves room for a null terminator and fits within `url&lowbar;impl`&apos;s 32&hyphen;bit offsets&period;


[.small]#Created with https://www.mrdocs.com[MrDocs]#
