[#wallet-ReserveDestination-2destructor]
= xref:wallet.adoc[wallet]::xref:wallet/ReserveDestination.adoc[ReserveDestination]::&#126;ReserveDestination
:relfileprefix: ../../
:mrdocs:

Destructor&period; If a key has been reserved and not KeepKey&apos;ed, it will be returned to the keypool

== Synopsis

Declared in `&lt;wallet&sol;wallet&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
&#126;ReserveDestination();
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
