[#wallet-CWallet-ScanResult-last_scanned_height]
= xref:wallet.adoc[wallet]::xref:wallet/CWallet.adoc[CWallet]::xref:wallet/CWallet/ScanResult.adoc[ScanResult]::last&lowbar;scanned&lowbar;height
:relfileprefix: ../../../
:mrdocs:

Height matching last&lowbar;scanned&lowbar;block, unset when no block was scanned&period;

== Synopsis

Declared in `&lt;wallet&sol;wallet&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
std::optional&lt;int&gt; last&lowbar;scanned&lowbar;height;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
