[#wallet-CWallet-ScanResult-last_failed_block]
= xref:wallet.adoc[wallet]::xref:wallet/CWallet.adoc[CWallet]::xref:wallet/CWallet/ScanResult.adoc[ScanResult]::last&lowbar;failed&lowbar;block
:relfileprefix: ../../../
:mrdocs:

Height of the most recent block that could not be scanned due to read errors or pruning&period; Will be set if status is FAILURE, unset if status is SUCCESS, and may or may not be set if status is USER&lowbar;ABORT&period;

== Synopsis

Declared in `&lt;wallet&sol;wallet&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
xref:uint256.adoc[uint256] last&lowbar;failed&lowbar;block;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
