[#util-TokenBucket-clock]
= xref:util.adoc[util]::xref:util/TokenBucket.adoc[TokenBucket]::clock
:relfileprefix: ../../
:mrdocs:

The clock type used to measure elapsed time&period;

== Synopsis

Declared in `&lt;util&sol;tokenbucket&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
using clock = Clock;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
