[#ser_readdata8]
= ser&lowbar;readdata8
:mrdocs:

Read a byte from a stream&period;

== Synopsis

Declared in `&lt;serialize&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
template&lt;typename Stream&gt;
uint8&lowbar;t
ser&lowbar;readdata8(Stream& s);
----

== Return Value

The byte read from the stream&period;

== Parameters

[cols="1,4"]
|===
| Name| Description
| *s*
| The stream to read from&period;
|===


[.small]#Created with https://www.mrdocs.com[MrDocs]#
