[#prevector-0c-resize_uninitialized]
= xref:prevector-0c.adoc[prevector]::resize&lowbar;uninitialized
:relfileprefix: ../
:mrdocs:

Changes the size to `new&lowbar;size` without initializing any newly added elements&period;

== Synopsis

Declared in `&lt;prevector&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
void
resize&lowbar;uninitialized(xref:prevector-0c/size_type.adoc[size&lowbar;type] new&lowbar;size);
----

== Parameters

[cols="1,4"]
|===
| Name| Description
| *new&lowbar;size*
| The desired number of elements&period;
|===


[.small]#Created with https://www.mrdocs.com[MrDocs]#
