[#prevector-0c-STATIC_SIZE]
= xref:prevector-0c.adoc[prevector]::STATIC&lowbar;SIZE
:relfileprefix: ../
:mrdocs:

Number of elements stored inline before switching to heap allocation&period;

== Synopsis

Declared in `&lt;prevector&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
inline constexpr static
unsigned int STATIC&lowbar;SIZE = &lcub;N&rcub;;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
