[#node-Warning]
= xref:node.adoc[node]::Warning
:relfileprefix: ../
:mrdocs:

Categories of node&hyphen;level warning shown to the user and over RPC&period;

== Synopsis

Declared in `&lt;node&sol;warnings&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
enum class Warning : int;
----

== Members

[cols="1,4"]
|===
| Name| Description
| `CLOCK&lowbar;OUT&lowbar;OF&lowbar;SYNC` 
| The local clock is out of sync with the network&period;
| `PRE&lowbar;RELEASE&lowbar;TEST&lowbar;BUILD` 
| The node is a pre&hyphen;release or test build, not for production use&period;
| `FATAL&lowbar;INTERNAL&lowbar;ERROR` 
| A fatal internal error occurred and the node must shut down&period;
|===



[.small]#Created with https://www.mrdocs.com[MrDocs]#
