[#node-ReadRawError]
= xref:node.adoc[node]::ReadRawError
:relfileprefix: ../
:mrdocs:

Reason a raw block read from disk failed&period;

== Synopsis

Declared in `&lt;node&sol;blockstorage&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
enum class ReadRawError : int;
----

== Members

[cols="1,4"]
|===
| Name| Description
| `IO` 
| A filesystem I&sol;O error occurred while reading&period;
| `BadPartRange` 
| The requested byte sub&hyphen;range lies outside the stored block&period;
|===



[.small]#Created with https://www.mrdocs.com[MrDocs]#
