[#node-LogOversizedDbCache]
= xref:node.adoc[node]::LogOversizedDbCache
:relfileprefix: ../
:mrdocs:

Log a warning when the configured database cache is larger than available RAM allows&period;

== Synopsis

Declared in `&lt;node&sol;caches&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
void
LogOversizedDbCache(xref:ArgsManager.adoc[ArgsManager] const& args) noexcept;
----

== Parameters

[cols="1,4"]
|===
| Name| Description
| *args*
| Argument manager holding the parsed settings&period;
|===


[.small]#Created with https://www.mrdocs.com[MrDocs]#
