[#node-KernelNotifications-m_stop_at_height]
= xref:node.adoc[node]::xref:node/KernelNotifications.adoc[KernelNotifications]::m&lowbar;stop&lowbar;at&lowbar;height
:relfileprefix: ../../
:mrdocs:

Block height after which blockTip notification will return Interrupted&lcub;&rcub;, if &gt;0&period;

== Synopsis

Declared in `&lt;node&sol;kernel&lowbar;notifications&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
int m&lowbar;stop&lowbar;at&lowbar;height = &lcub;DEFAULT&lowbar;STOPATHEIGHT&rcub;;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
