[#node-KernelNotifications-m_shutdown_on_fatal_error]
= xref:node.adoc[node]::xref:node/KernelNotifications.adoc[KernelNotifications]::m&lowbar;shutdown&lowbar;on&lowbar;fatal&lowbar;error
:relfileprefix: ../../
:mrdocs:

Useful for tests, can be set to false to avoid shutdown on fatal error&period;

== Synopsis

Declared in `&lt;node&sol;kernel&lowbar;notifications&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
bool m&lowbar;shutdown&lowbar;on&lowbar;fatal&lowbar;error = &lcub;true&rcub;;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
