[#node-DEFAULT_STOPATHEIGHT]
= xref:node.adoc[node]::DEFAULT&lowbar;STOPATHEIGHT
:relfileprefix: ../
:mrdocs:

Default for `&hyphen;stopatheight`&semi; 0 means never stop at a given height&period;

== Synopsis

Declared in `&lt;node&sol;kernel&lowbar;notifications&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
inline constexpr int DEFAULT&lowbar;STOPATHEIGHT = &lcub;0&rcub;;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
