[#node-DEFAULT_PERSIST_MEMPOOL]
= xref:node.adoc[node]::DEFAULT&lowbar;PERSIST&lowbar;MEMPOOL
:relfileprefix: ../
:mrdocs:

Default for &hyphen;persistmempool, indicating whether the node should attempt to automatically load the mempool on start and save to disk on shutdown

== Synopsis

Declared in `&lt;node&sol;mempool&lowbar;persist&lowbar;args&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
inline constexpr bool DEFAULT&lowbar;PERSIST&lowbar;MEMPOOL = &lcub;true&rcub;;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
