[#node-DEFAULT_MAX_BURN_AMOUNT]
= xref:node.adoc[node]::DEFAULT&lowbar;MAX&lowbar;BURN&lowbar;AMOUNT
:relfileprefix: ../
:mrdocs:

Maximum burn value for sendrawtransaction, submitpackage, and testmempoolaccept RPC calls&period; By default, a transaction with a burn value higher than this will be rejected by these RPCs and the GUI&period; This can be overridden with the maxburnamount argument&period;

== Synopsis

Declared in `&lt;node&sol;transaction&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
inline constexpr xref:CAmount.adoc[CAmount] DEFAULT&lowbar;MAX&lowbar;BURN&lowbar;AMOUNT = &lcub;0&rcub;;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
