[#node-ChainstateLoadOptions-require_full_verification]
= xref:node.adoc[node]::xref:node/ChainstateLoadOptions.adoc[ChainstateLoadOptions]::require&lowbar;full&lowbar;verification
:relfileprefix: ../../
:mrdocs:

Setting require&lowbar;full&lowbar;verification to true will require all checks at check&lowbar;level (below) to succeed for loading to succeed&period; Setting it to false will skip checks if cache is not big enough to run them, so may be helpful for running with a small cache&period;

== Synopsis

Declared in `&lt;node&sol;chainstate&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
bool require&lowbar;full&lowbar;verification = &lcub;true&rcub;;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
