[#node-BlockWaitOptions-timeout]
= xref:node.adoc[node]::xref:node/BlockWaitOptions.adoc[BlockWaitOptions]::timeout
:relfileprefix: ../../
:mrdocs:

How long to wait before returning nullptr instead of a new template&period; Default is to wait forever&period;

== Synopsis

Declared in `&lt;node&sol;mining&lowbar;types&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
xref:MillisecondsDouble.adoc[MillisecondsDouble] timeout = &lcub;MillisecondsDouble&colon;&colon;max()&rcub;;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
