[#node-BlockManager-ReadRawBlockResult]
= xref:node.adoc[node]::xref:node/BlockManager.adoc[BlockManager]::ReadRawBlockResult
:relfileprefix: ../../
:mrdocs:

Result of a raw block read&colon; the bytes on success, or a ReadRawError on failure&period;

== Synopsis

Declared in `&lt;node&sol;blockstorage&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
using ReadRawBlockResult = xref:util/Expected-0b.adoc[util::Expected&lt;std::vector&lt;std::byte&gt;, ReadRawError&gt;];
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
