[#nConnectTimeout]
= nConnectTimeout
:mrdocs:

Connection timeout in milliseconds, set by the `&hyphen;timeout` option&period;

== Synopsis

Declared in `&lt;netbase&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
extern
int nConnectTimeout;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
