[#miniscript-Node-CheckStackSize]
= xref:miniscript.adoc[miniscript]::xref:miniscript/Node.adoc[Node]::CheckStackSize
:relfileprefix: ../../
:mrdocs:

Check the maximum stack size for this script against the policy limit&period;

== Synopsis

Declared in `&lt;script&sol;miniscript&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
bool
CheckStackSize() const;
----

== Return Value

True if the stack size stays within the applicable limit&period;


[.small]#Created with https://www.mrdocs.com[MrDocs]#
