[#miniscript-Node-CheckOpsLimit]
= xref:miniscript.adoc[miniscript]::xref:miniscript/Node.adoc[Node]::CheckOpsLimit
:relfileprefix: ../../
:mrdocs:

Check the ops limit of this script against the consensus limit&period;

== Synopsis

Declared in `&lt;script&sol;miniscript&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
bool
CheckOpsLimit() const;
----

== Return Value

True if the script is within the consensus ops limit&period;


[.small]#Created with https://www.mrdocs.com[MrDocs]#
