[#kernel-ChainstateManagerOpts-signature_cache_bytes]
= xref:kernel.adoc[kernel]::xref:kernel/ChainstateManagerOpts.adoc[ChainstateManagerOpts]::signature&lowbar;cache&lowbar;bytes
:relfileprefix: ../../
:mrdocs:

Size, in bytes, of the signature verification cache&period;

== Synopsis

Declared in `&lt;kernel&sol;chainstatemanager&lowbar;opts&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
size&lowbar;t signature&lowbar;cache&lowbar;bytes = &lcub;DEFAULT&lowbar;SIGNATURE&lowbar;CACHE&lowbar;BYTES&rcub;;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
