[#common-SettingsSpan-last_negated]
= xref:common.adoc[common]::xref:common/SettingsSpan.adoc[SettingsSpan]::last&lowbar;negated
:relfileprefix: ../../
:mrdocs:

Whether the final value in the span is a negation&period;

== Synopsis

Declared in `&lt;common&sol;settings&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
bool
last&lowbar;negated() const;
----

== Return Value

True if the last value is negated&period;


[.small]#Created with https://www.mrdocs.com[MrDocs]#
