[#btck_logging_disable]
= btck&lowbar;logging&lowbar;disable
:mrdocs:

This disables the global internal logger&period; No log messages will be buffered internally anymore once this is called and the buffer is cleared&period; This function should only be called once and is not thread or re&hyphen;entry safe&period; Log messages will be buffered until this function is called, or a logging connection is created&period; This must not be called while a logging connection already exists&period;

== Synopsis

Declared in `&lt;kernel&sol;bitcoinkernel&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
void
btck&lowbar;logging&lowbar;disable();
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
