[#btck_LoggingConnection-06]
= btck&lowbar;LoggingConnection
:mrdocs:

Opaque data structure for holding a logging connection&period;

== Synopsis

Declared in `&lt;kernel&sol;bitcoinkernel&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
struct btck&lowbar;LoggingConnection;
----

== Description

The logging connection can be used to manually stop logging&period;

Messages that were logged before a connection is created are buffered in a 1MB buffer&period; Logging can alternatively be permanently disabled by calling xref:btck_logging_disable.adoc[`btck&lowbar;logging&lowbar;disable`]&period; Functions changing the logging settings are global and change the settings for all existing btck&lowbar;LoggingConnection instances&period;


[.small]#Created with https://www.mrdocs.com[MrDocs]#
