[#bitcoin_http-MIN_REQUEST_LINE_LENGTH]
= xref:bitcoin_http.adoc[bitcoin&lowbar;http]::MIN&lowbar;REQUEST&lowbar;LINE&lowbar;LENGTH
:relfileprefix: ../
:mrdocs:

Shortest valid request line, used by libevent in evhttp&lowbar;parse&lowbar;request&lowbar;line()

== Synopsis

Declared in `&lt;httpserver&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
inline constexpr size&lowbar;t MIN&lowbar;REQUEST&lowbar;LINE&lowbar;LENGTH = std&colon;&colon;string&lowbar;view(&quot;GET &sol; HTTP&sol;1&period;0&quot;)&period;size();
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
