[#bech32-CHECKSUM_SIZE]
= xref:bech32.adoc[bech32]::CHECKSUM&lowbar;SIZE
:relfileprefix: ../
:mrdocs:

Number of trailing checksum characters in a Bech32(m) string&period;

== Synopsis

Declared in `&lt;bech32&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
inline constexpr size&lowbar;t CHECKSUM&lowbar;SIZE = 6;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
