[#base_uint-02-WIDTH]
= xref:base_uint-02.adoc[base&lowbar;uint]::WIDTH
:relfileprefix: ../
:mrdocs:

Number of 32&hyphen;bit digits used to store the value&period;

== Synopsis

Declared in `&lt;arith&lowbar;uint256&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
inline constexpr static
int WIDTH = BITS &sol; 32;
----


[.small]#Created with https://www.mrdocs.com[MrDocs]#
