[#VerifyDBResult]
= VerifyDBResult
:mrdocs:

Outcome of verifying the consistency of the block and coin databases&period;

== Synopsis

Declared in `&lt;validation&period;h&gt;`

[source,cpp,subs="verbatim,replacements,macros,-callouts"]
----
enum class VerifyDBResult : int;
----

== Members

[cols="1,4"]
|===
| Name| Description
| `SUCCESS` 
| Verification completed and the databases are consistent&period;
| `CORRUPTED&lowbar;BLOCK&lowbar;DB` 
| The block database was found to be corrupted&period;
| `INTERRUPTED` 
| Verification was interrupted before completion&period;
| `SKIPPED&lowbar;L3&lowbar;CHECKS` 
| Level&hyphen;3 checks were skipped (e&period;g&period; insufficient disk)&period;
| `SKIPPED&lowbar;MISSING&lowbar;BLOCKS` 
| Verification was skipped because required blocks were missing (e&period;g&period; pruned)&period;
|===



[.small]#Created with https://www.mrdocs.com[MrDocs]#
